/*
 Navicat Premium Data Transfer

 Date: 09/01/2020 10:37:59
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ac_activity_feedback
-- ----------------------------
DROP TABLE IF EXISTS `ac_activity_feedback`;
CREATE TABLE `ac_activity_feedback`  (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `activity_id` int(11) NULL DEFAULT NULL COMMENT '活动id',
  `user_id` int(11) NULL DEFAULT NULL COMMENT '用户id',
  `feedback_name` varchar(16) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '微信昵称',
  `weixin_head_url` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '微信头像',
  `user_type` varchar(2) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '用户类型(0政府，1园区，2超级管理员,3企业,4街道,5个人,6微信)',
  `feedback_type` int(1) NULL DEFAULT 0 COMMENT ' 评分 1:一星、2：二星、3:三星、4:四星、5:五星、0：无星  废弃字段',
  `approval_status` int(1) NULL DEFAULT NULL COMMENT '0：未审核、1:已审核    废弃字段',
  `content` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT '反馈内容',
  `feedback_time` datetime(0) NULL DEFAULT NULL COMMENT '反馈时间',
  `reply` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT '回复',
  `reply_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '回复人id',
  `score_1` int(2) NULL DEFAULT NULL COMMENT '内容设计星级 共五星 一星4分',
  `score_2` int(2) NULL DEFAULT NULL COMMENT '讲师水平星级 共五星 一星4分',
  `score_3` int(2) NULL DEFAULT NULL COMMENT '活动效果星级 共五星 一星12分',
  `score` int(4) NULL DEFAULT NULL COMMENT '综合评分',
  `is_public` tinyint(1) NULL DEFAULT NULL COMMENT '是否公开',
  `is_view` tinyint(1) NULL DEFAULT NULL COMMENT '是否门户显示',
  `is_top` tinyint(1) NULL DEFAULT NULL COMMENT '是否置顶',
  `del_flag` tinyint(1) NULL DEFAULT 0 COMMENT '删除标记',
  `create_time` varchar(45) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '创建时间',
  `create_by` int(11) NULL DEFAULT NULL COMMENT '创建人id',
  `create_name` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '创建人姓名',
  `update_time` varchar(45) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '修改时间',
  `update_by` int(11) NULL DEFAULT NULL COMMENT '修改人id',
  `update_name` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT '修改人姓名',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 16 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '活动反馈' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
